%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Ola_etal2024} Ola, I., Drebenstedt, C., Burgess, R. M., Allan, I. J., Hoth, N., \& K{\"u}lls, C. (2024). Application of Low Density Polyethylene (LDPE) Passive Samplers for Monitoring PAHs in Groundwater.

\end{thebibliography}

\end{document}

